<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.27369640867
cusum  =  0.179074949511
eta  =  0.710671335339
hl_amp_ratio  =  0.506232830721
kurtosis  =  -0.90835788469
n_points  =  256
period  =  0.652698966833
period_SNR  =  33.6827342133
period_log10FAP  =  -29.3260348458
period_uncertainty  =  0.000191632122436
phase_cusum  =  0.254027830595
phase_eta  =  0.518966411925
phi21  =  4.04592092643
phi31  =  6.04508622819
quartile31  =  0.425
r21  =  0.421595363445
r31  =  0.115568109172
shapiro_w  =  0.954809308052
skewness  =  -0.362496043423
slope_per10  =  -0.135200005025
slope_per90  =  0.208133325602
stetson_k  =  0.792822432299
weighted_mean  =  15.9070813752
weighted_std  =  0.256785429406
</pre></body></html>