-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.62


######### Lightcurve features #########

amplitude  =  0.423130310302
cusum  =  0.150093877624
eta  =  0.593494512062
hl_amp_ratio  =  0.263683949384
kurtosis  =  -0.383864608057
n_points  =  137
period  =  0.854606239363
period_SNR  =  17.8346981405
period_log10FAP  =  -12.8637189027
period_uncertainty  =  0.000326363585929
phase_cusum  =  0.250379602245
phase_eta  =  0.562663036436
phi21  =  -2.93033804494
phi31  =  -3.69145095394
quartile31  =  0.48
r21  =  0.349229568668
r31  =  0.128822819572
shapiro_w  =  0.844138264656
skewness  =  -0.983145868252
slope_per10  =  -0.209269999992
slope_per90  =  0.390825002687
stetson_k  =  0.673854320968
weighted_mean  =  14.378170395
weighted_std  =  0.359262828063
