-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.301423158197
cusum  =  0.125375134715
eta  =  0.502600574628
hl_amp_ratio  =  0.225112215882
kurtosis  =  -0.310993847126
n_points  =  386
period  =  0.621286370252
period_SNR  =  45.5315721324
period_log10FAP  =  -49.2847381907
period_uncertainty  =  0.000107645434222
phase_cusum  =  0.262684943719
phase_eta  =  0.064787833514
phi21  =  -2.35045216006
phi31  =  -1.2815753634
quartile31  =  0.34
r21  =  0.450664114683
r31  =  0.333279784533
shapiro_w  =  0.853461742401
skewness  =  -0.982689809008
slope_per10  =  -0.136670168075
slope_per90  =  0.219018551698
stetson_k  =  0.67572683351
weighted_mean  =  15.801015522
weighted_std  =  0.253309073084
