-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.303107384032
cusum  =  0.118155280794
eta  =  0.565170690266
hl_amp_ratio  =  0.473140495897
kurtosis  =  -0.983195102381
n_points  =  357
period  =  0.613750236355
period_SNR  =  47.3540131438
period_log10FAP  =  -49.9552249765
period_uncertainty  =  0.000104807078814
phase_cusum  =  0.227234549101
phase_eta  =  0.0687450316429
phi21  =  0.827376696029
phi31  =  1.99603631415
quartile31  =  0.46
r21  =  0.496699884996
r31  =  0.348835772909
shapiro_w  =  0.919040024281
skewness  =  -0.532356406013
slope_per10  =  -0.164325158724
slope_per90  =  0.14486150987
stetson_k  =  0.790870116367
weighted_mean  =  16.4813153064
weighted_std  =  0.277139617751
