-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.73


######### Lightcurve features #########

amplitude  =  0.271237646513
cusum  =  0.172454040046
eta  =  0.937834693309
hl_amp_ratio  =  0.229153608938
kurtosis  =  1.36747720848
n_points  =  167
period  =  0.763033101985
period_SNR  =  27.6614789586
period_log10FAP  =  -17.2229097786
period_uncertainty  =  0.000172180056702
phase_cusum  =  0.253827117542
phase_eta  =  0.208695814564
phi21  =  -2.30959647286
phi31  =  -4.77899109456
quartile31  =  0.23
r21  =  0.363823324288
r31  =  0.303933323971
shapiro_w  =  0.860745549202
skewness  =  -1.03064434673
slope_per10  =  -0.263031143935
slope_per90  =  0.520476175187
stetson_k  =  0.634191027457
weighted_mean  =  14.6177533557
weighted_std  =  0.203927532531
