-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.314279536866
cusum  =  0.132296788738
eta  =  0.670297297843
hl_amp_ratio  =  0.570354819092
kurtosis  =  -0.817399095696
n_points  =  360
period  =  0.641705497212
period_SNR  =  40.4530691512
period_log10FAP  =  -41.250016097
period_uncertainty  =  0.000116200477584
phase_cusum  =  0.278540997496
phase_eta  =  0.159460682252
phi21  =  0.866527694136
phi31  =  -0.975511067579
quartile31  =  0.43
r21  =  0.49831043801
r31  =  0.374016624911
shapiro_w  =  0.936330676079
skewness  =  -0.404362090355
slope_per10  =  -0.217706248841
slope_per90  =  0.263857659816
stetson_k  =  0.828266932321
weighted_mean  =  13.5795893582
weighted_std  =  0.274371760107
