-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.262924085886
cusum  =  0.183892378479
eta  =  0.763653381981
hl_amp_ratio  =  0.607691621061
kurtosis  =  -0.940592792884
n_points  =  157
period  =  0.59018341698
period_SNR  =  25.0429229413
period_log10FAP  =  -17.5761401992
period_uncertainty  =  0.000102855251688
phase_cusum  =  0.302895770213
phase_eta  =  0.239785125921
phi21  =  1.14635418466
phi31  =  2.49016123524
quartile31  =  0.35
r21  =  0.524622773963
r31  =  0.278238313904
shapiro_w  =  0.949062466621
skewness  =  -0.355630619853
slope_per10  =  -0.231108718651
slope_per90  =  0.388849027751
stetson_k  =  0.819400044088
weighted_mean  =  15.6146002385
weighted_std  =  0.209947433627
