-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.291049025883
cusum  =  0.128658185052
eta  =  0.484719822842
hl_amp_ratio  =  0.404370280112
kurtosis  =  -0.485984252402
n_points  =  425
period  =  0.681551446977
period_SNR  =  49.2905694774
period_log10FAP  =  -54.1542659576
period_uncertainty  =  0.000129908407812
phase_cusum  =  0.222108623402
phase_eta  =  0.235578729283
phi21  =  0.862177831974
phi31  =  2.15003062835
quartile31  =  0.35
r21  =  0.48012624659
r31  =  0.282540800243
shapiro_w  =  0.915336728096
skewness  =  -0.76118184301
slope_per10  =  -0.102414968611
slope_per90  =  0.25239999406
stetson_k  =  0.749632368766
weighted_mean  =  13.508338964
weighted_std  =  0.24755250142
