-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.268386724642
cusum  =  0.16799551397
eta  =  0.466782412262
hl_amp_ratio  =  0.483700454786
kurtosis  =  -0.892130593871
n_points  =  342
period  =  0.702505436977
period_SNR  =  42.5679638881
period_log10FAP  =  -46.0301532272
period_uncertainty  =  0.000137401318803
phase_cusum  =  0.299960957968
phase_eta  =  0.0569763668372
phi21  =  0.919767757317
phi31  =  2.15410604932
quartile31  =  0.36
r21  =  0.488646101034
r31  =  0.343860980497
shapiro_w  =  0.920516192913
skewness  =  -0.571041289334
slope_per10  =  -0.172668818213
slope_per90  =  0.31511841382
stetson_k  =  0.785453776128
weighted_mean  =  15.8749663971
weighted_std  =  0.22841791212
