-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.342864904376
cusum  =  0.141890816363
eta  =  0.623472466573
hl_amp_ratio  =  0.320347428222
kurtosis  =  -0.593772504872
n_points  =  271
period  =  0.576811772888
period_SNR  =  36.0235197424
period_log10FAP  =  -34.8123110916
period_uncertainty  =  0.000142607529747
phase_cusum  =  0.26597989228
phase_eta  =  0.240844274884
phi21  =  0.916350296813
phi31  =  1.82085508147
quartile31  =  0.455
r21  =  0.44174386191
r31  =  0.269092859791
shapiro_w  =  0.874525010586
skewness  =  -0.83358917891
slope_per10  =  -0.146544690687
slope_per90  =  0.318449476414
stetson_k  =  0.746272140112
weighted_mean  =  13.7018726592
weighted_std  =  0.309111107319
