-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.74


######### Lightcurve features #########

amplitude  =  0.209815945782
cusum  =  0.174504156116
eta  =  0.923737668064
hl_amp_ratio  =  0.353713459858
kurtosis  =  0.615113350793
n_points  =  110
period  =  0.566387667237
period_SNR  =  14.1150701995
period_log10FAP  =  -7.69087995874
period_uncertainty  =  0.000155100351081
phase_cusum  =  0.260194381004
phase_eta  =  0.527983031995
phi21  =  -2.44496988822
phi31  =  -4.40397783598
quartile31  =  0.2175
r21  =  0.44235220363
r31  =  0.190823337102
shapiro_w  =  0.926606357098
skewness  =  -0.656576703443
slope_per10  =  -0.169761455433
slope_per90  =  0.592814141115
stetson_k  =  0.697749641166
weighted_mean  =  15.1324729831
weighted_std  =  0.174822506522
