-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.314724364964
cusum  =  0.0904844269539
eta  =  0.573974549128
hl_amp_ratio  =  0.389610799019
kurtosis  =  -0.447387730863
n_points  =  368
period  =  0.64293406041
period_SNR  =  43.8285768232
period_log10FAP  =  -47.2956356199
period_uncertainty  =  0.000115602359099
phase_cusum  =  0.256570150425
phase_eta  =  0.0261991360968
phi21  =  -2.27994656029
phi31  =  -1.03327903252
quartile31  =  0.3925
r21  =  0.534701618093
r31  =  0.350096929571
shapiro_w  =  0.911083757877
skewness  =  -0.783637656135
slope_per10  =  -0.210317783631
slope_per90  =  0.301717797656
stetson_k  =  0.740139029964
weighted_mean  =  15.6461305797
weighted_std  =  0.263026558562
