-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.345368945643
cusum  =  0.215807111245
eta  =  0.554311012556
hl_amp_ratio  =  0.471352517094
kurtosis  =  -1.05575072141
n_points  =  283
period  =  0.576553901037
period_SNR  =  39.4490861637
period_log10FAP  =  -35.192546512
period_uncertainty  =  0.000133320478285
phase_cusum  =  0.302845036338
phase_eta  =  0.0474802378166
phi21  =  -2.26441895428
phi31  =  -1.02287456351
quartile31  =  0.505
r21  =  0.515497731286
r31  =  0.371821439378
shapiro_w  =  0.930390179157
skewness  =  -0.421028475774
slope_per10  =  -0.171850001207
slope_per90  =  0.316839546252
stetson_k  =  0.794349666773
weighted_mean  =  14.58955127
weighted_std  =  0.32010765414
