-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.369657555917
cusum  =  0.138314087397
eta  =  0.537323220189
hl_amp_ratio  =  0.240259428994
kurtosis  =  -0.640688456454
n_points  =  367
period  =  0.76250915726
period_SNR  =  40.6790008888
period_log10FAP  =  -44.0309091924
period_uncertainty  =  0.000161767903558
phase_cusum  =  0.237705688079
phase_eta  =  0.490410708068
phi21  =  0.501167739503
phi31  =  1.52832547032
quartile31  =  0.51
r21  =  0.468519763809
r31  =  0.0795575102702
shapiro_w  =  0.878265559673
skewness  =  -0.80582444124
slope_per10  =  -0.0862800814794
slope_per90  =  0.226518652531
stetson_k  =  0.711394775118
weighted_mean  =  13.4390374088
weighted_std  =  0.342691598157
