-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.291132292737
cusum  =  0.145035206857
eta  =  0.580431380831
hl_amp_ratio  =  0.451992333426
kurtosis  =  -0.75141654683
n_points  =  413
period  =  0.673820055249
period_SNR  =  46.4010481392
period_log10FAP  =  -50.1579488244
period_uncertainty  =  0.000120877596883
phase_cusum  =  0.258842345593
phase_eta  =  0.579394318241
phi21  =  -2.24685399193
phi31  =  -1.27144277569
quartile31  =  0.45
r21  =  0.442310891036
r31  =  0.183053010327
shapiro_w  =  0.934108614922
skewness  =  -0.584974678674
slope_per10  =  -0.0853977970452
slope_per90  =  0.152198918165
stetson_k  =  0.78762572519
weighted_mean  =  13.0439659367
weighted_std  =  0.271090146359
