<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.54


######### Lightcurve features #########

amplitude  =  0.288508895753
cusum  =  0.123134721459
eta  =  0.621192599152
hl_amp_ratio  =  0.629820598602
kurtosis  =  -0.728137734452
n_points  =  306
period  =  0.630423538652
period_SNR  =  35.7469220242
period_log10FAP  =  -34.8378695048
period_uncertainty  =  0.000108581391079
phase_cusum  =  0.230278980957
phase_eta  =  0.499784416806
phi21  =  0.606696312553
phi31  =  1.87591014004
quartile31  =  0.4575
r21  =  0.244785540274
r31  =  0.336387526848
shapiro_w  =  0.957313299179
skewness  =  -0.428943302603
slope_per10  =  -0.0720110072087
slope_per90  =  0.200297509177
stetson_k  =  0.828642566922
weighted_mean  =  11.770620915
weighted_std  =  0.274697587888
</pre></body></html>