-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.348758320661
cusum  =  0.121748471061
eta  =  0.450523461748
hl_amp_ratio  =  0.319356267057
kurtosis  =  -0.945425550712
n_points  =  368
period  =  0.647966092601
period_SNR  =  47.5047872653
period_log10FAP  =  -50.7285693277
period_uncertainty  =  0.000116834856261
phase_cusum  =  0.257144654801
phase_eta  =  0.049795229933
phi21  =  0.741926959164
phi31  =  1.76975173921
quartile31  =  0.5425
r21  =  0.498781142624
r31  =  0.370071715972
shapiro_w  =  0.88209682703
skewness  =  -0.678173408153
slope_per10  =  -0.166337343035
slope_per90  =  0.172350001521
stetson_k  =  0.731439362409
weighted_mean  =  16.6755142153
weighted_std  =  0.344550531396
