<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_F
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.235930906028
cusum  =  0.134790571373
eta  =  1.01756290188
hl_amp_ratio  =  1.00307244576
kurtosis  =  -0.990638603515
n_points  =  143
period  =  2.60766178852
period_SNR  =  21.0524020414
period_log10FAP  =  -13.1459612305
period_uncertainty  =  0.00163643728614
phase_cusum  =  0.246702981387
phase_eta  =  0.537231466576
phi21  =  -1.08344040972
phi31  =  -3.29037854235
quartile31  =  0.355
r21  =  0.339578485595
r31  =  0.146520907317
shapiro_w  =  0.972059369087
skewness  =  0.00375170250824
slope_per10  =  -0.876500015147
slope_per90  =  0.667164586427
stetson_k  =  0.854257946871
weighted_mean  =  14.9579064112
weighted_std  =  0.22823857026
</pre></body></html>