-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.33611975477
cusum  =  0.250993802463
eta  =  0.997053329846
hl_amp_ratio  =  0.661544153507
kurtosis  =  -1.3040609465
n_points  =  41
period  =  0.506243814515
period_SNR  =  12.8029489411
period_log10FAP  =  -2.15475298786
period_uncertainty  =  0.000100107540896
phase_cusum  =  0.290172874864
phase_eta  =  0.442104480492
phi21  =  0.938898868518
phi31  =  1.89713760378
quartile31  =  0.61
r21  =  0.349785005058
r31  =  0.25977480116
shapiro_w  =  0.900156736374
skewness  =  -0.320747810052
slope_per10  =  -0.28360674696
slope_per90  =  0.648953888863
stetson_k  =  0.853898290429
weighted_mean  =  14.7213956014
weighted_std  =  0.301421997151
