-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.241862338753
cusum  =  0.0924399769948
eta  =  0.653989578698
hl_amp_ratio  =  0.600762262102
kurtosis  =  -0.798142327314
n_points  =  301
period  =  0.713336197079
period_SNR  =  45.6683914292
period_log10FAP  =  -40.8525949589
period_uncertainty  =  0.000146331383009
phase_cusum  =  0.24777686531
phase_eta  =  0.0885337169732
phi21  =  -2.29279275058
phi31  =  -4.19180618418
quartile31  =  0.28
r21  =  0.443698013706
r31  =  0.298820729828
shapiro_w  =  0.932280778885
skewness  =  -0.531890373177
slope_per10  =  -0.299102203603
slope_per90  =  0.393051809634
stetson_k  =  0.814230698034
weighted_mean  =  13.6513068262
weighted_std  =  0.197984525439
