-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.196234077407
cusum  =  0.12687868691
eta  =  0.582861683567
hl_amp_ratio  =  0.660266818649
kurtosis  =  -0.845738865432
n_points  =  359
period  =  0.722590454399
period_SNR  =  46.4642970173
period_log10FAP  =  -49.9731140168
period_uncertainty  =  0.000145296887808
phase_cusum  =  0.22913026141
phase_eta  =  0.121066863772
phi21  =  -2.04510093934
phi31  =  -3.92095088563
quartile31  =  0.27
r21  =  0.419728090875
r31  =  0.294329094325
shapiro_w  =  0.943972587585
skewness  =  -0.46797692357
slope_per10  =  -0.243942796454
slope_per90  =  0.271962015184
stetson_k  =  0.836528656888
weighted_mean  =  15.6222972312
weighted_std  =  0.16555251462
