<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.316025490387
cusum  =  0.104560456758
eta  =  0.569449932283
hl_amp_ratio  =  0.422568745437
kurtosis  =  -0.625043931364
n_points  =  348
period  =  0.521815108115
period_SNR  =  38.195487563
period_log10FAP  =  -38.6631314523
period_uncertainty  =  7.74988295556e-05
phase_cusum  =  0.282538387608
phase_eta  =  0.472103417477
phi21  =  0.915104168911
phi31  =  2.03571362234
quartile31  =  0.47
r21  =  0.429089118361
r31  =  0.259678192446
shapiro_w  =  0.91707265377
skewness  =  -0.681341138126
slope_per10  =  -0.0873280028531
slope_per90  =  0.107497142628
stetson_k  =  0.763987280881
weighted_mean  =  14.0793344514
weighted_std  =  0.301091798617
</pre></body></html>