-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.280372827424
cusum  =  0.162822076333
eta  =  0.540637753989
hl_amp_ratio  =  0.408519802191
kurtosis  =  -1.01074405239
n_points  =  149
period  =  0.569777926554
period_SNR  =  23.2831700459
period_log10FAP  =  -16.3231114898
period_uncertainty  =  0.000136366442481
phase_cusum  =  0.263141931693
phase_eta  =  0.253132376917
phi21  =  -2.22228333642
phi31  =  -4.08945580231
quartile31  =  0.54
r21  =  0.599119149623
r31  =  0.382375447942
shapiro_w  =  0.921594202518
skewness  =  -0.502561165259
slope_per10  =  -0.289503688268
slope_per90  =  0.342241536135
stetson_k  =  0.747990601021
weighted_mean  =  16.2069442073
weighted_std  =  0.298209668813
