-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.296044287691
cusum  =  0.193843883776
eta  =  0.546014825891
hl_amp_ratio  =  0.412626002291
kurtosis  =  -0.456469351868
n_points  =  117
period  =  0.586569633007
period_SNR  =  14.8416628366
period_log10FAP  =  -11.8546855788
period_uncertainty  =  0.000106983594466
phase_cusum  =  0.259913607139
phase_eta  =  0.299456048749
phi21  =  0.790873322747
phi31  =  1.88157172364
quartile31  =  0.39
r21  =  0.401108394076
r31  =  0.221509322929
shapiro_w  =  0.896971046925
skewness  =  -0.807598818832
slope_per10  =  -0.338000012562
slope_per90  =  0.57200002484
stetson_k  =  0.745147398525
weighted_mean  =  14.7364914512
weighted_std  =  0.259184104433
