-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.45


######### Lightcurve features #########

amplitude  =  0.343682819358
cusum  =  0.0896892203415
eta  =  0.741806617292
hl_amp_ratio  =  0.626255112558
kurtosis  =  -0.599937991816
n_points  =  228
period  =  0.359895429278
period_SNR  =  25.7024974353
period_log10FAP  =  -23.2101476784
period_uncertainty  =  5.65229001429e-05
phase_cusum  =  0.22459671983
phase_eta  =  0.826987106431
phi21  =  -1.73677853736
phi31  =  -1.68387175344
quartile31  =  0.4775
r21  =  0.24715246697
r31  =  0.0328693753119
shapiro_w  =  0.96526569128
skewness  =  -0.456797331883
slope_per10  =  -0.0447086852907
slope_per90  =  0.0882366280026
stetson_k  =  0.804759687971
weighted_mean  =  12.443997061
weighted_std  =  0.312369362541
