-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.297115650853
cusum  =  0.131975866977
eta  =  0.511760808832
hl_amp_ratio  =  0.763897301474
kurtosis  =  -1.13198988312
n_points  =  319
period  =  0.664165562358
period_SNR  =  48.9008701359
period_log10FAP  =  -42.9463547983
period_uncertainty  =  0.000125513187907
phase_cusum  =  0.293334419413
phase_eta  =  0.275167923462
phi21  =  -1.9741390627
phi31  =  -0.485649136124
quartile31  =  0.41
r21  =  0.369376945468
r31  =  0.212374833403
shapiro_w  =  0.935959041119
skewness  =  -0.346703638474
slope_per10  =  -0.106950343492
slope_per90  =  0.200793619898
stetson_k  =  0.863060397007
weighted_mean  =  13.9711048626
weighted_std  =  0.248022830026
