-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.312088239992
cusum  =  0.150971813126
eta  =  0.496736600873
hl_amp_ratio  =  0.435108453851
kurtosis  =  -0.42516568583
n_points  =  308
period  =  0.618414885909
period_SNR  =  38.0400293624
period_log10FAP  =  -39.6336305987
period_uncertainty  =  0.00010855478588
phase_cusum  =  0.268580268765
phase_eta  =  0.106115410992
phi21  =  0.850799207305
phi31  =  2.08929338255
quartile31  =  0.3525
r21  =  0.484540901344
r31  =  0.265962231606
shapiro_w  =  0.914008557796
skewness  =  -0.76207296789
slope_per10  =  -0.153086982803
slope_per90  =  0.374820316385
stetson_k  =  0.75417016021
weighted_mean  =  14.6896077071
weighted_std  =  0.253172907233
