-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.65


######### Lightcurve features #########

amplitude  =  0.151541811443
cusum  =  0.158731307466
eta  =  0.613844905145
hl_amp_ratio  =  1.12125659749
kurtosis  =  -1.04672435832
n_points  =  335
period  =  0.635391380653
period_SNR  =  44.2194282903
period_log10FAP  =  -42.4696291012
period_uncertainty  =  0.000112418860535
phase_cusum  =  0.251844617274
phase_eta  =  0.541274894096
phi21  =  -1.78269335892
phi31  =  -3.83455623839
quartile31  =  0.235
r21  =  0.276693091765
r31  =  0.20865046357
shapiro_w  =  0.969742536545
skewness  =  0.00497602513976
slope_per10  =  -0.158202678152
slope_per90  =  0.0963242373857
stetson_k  =  0.855003040005
weighted_mean  =  16.5909059108
weighted_std  =  0.138060410314
