-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.427994257302
cusum  =  0.153215557384
eta  =  0.769824613381
hl_amp_ratio  =  0.146446126062
kurtosis  =  -0.564092909247
n_points  =  149
period  =  0.461137394296
period_SNR  =  25.0585467927
period_log10FAP  =  -17.4463820576
period_uncertainty  =  0.00012793736261
phase_cusum  =  0.320905623705
phase_eta  =  0.183028443529
phi21  =  -2.67618282899
phi31  =  -1.5155004091
quartile31  =  0.52
r21  =  0.451984791854
r31  =  0.185825946355
shapiro_w  =  0.808958888054
skewness  =  -0.971174742112
slope_per10  =  -0.179554657097
slope_per90  =  0.231750728562
stetson_k  =  0.627486581889
weighted_mean  =  15.0751821855
weighted_std  =  0.373358327033
