-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.86


######### Lightcurve features #########

amplitude  =  0.383970193184
cusum  =  0.126853681315
eta  =  0.68591811752
hl_amp_ratio  =  0.429768387685
kurtosis  =  -0.933808733108
n_points  =  293
period  =  0.567980039009
period_SNR  =  44.3039148886
period_log10FAP  =  -37.6437617193
period_uncertainty  =  0.000110782145624
phase_cusum  =  0.268198207884
phase_eta  =  0.0361722757665
phi21  =  0.807505882821
phi31  =  2.02547107098
quartile31  =  0.53
r21  =  0.532002719178
r31  =  0.320921860828
shapiro_w  =  0.920736312866
skewness  =  -0.555772316895
slope_per10  =  -0.185635908422
slope_per90  =  0.238572914757
stetson_k  =  0.782460604928
weighted_mean  =  12.8396382885
weighted_std  =  0.334596375691
