-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.349122517852
cusum  =  0.168718679435
eta  =  0.845411211325
hl_amp_ratio  =  0.566061177034
kurtosis  =  -0.569046645489
n_points  =  149
period  =  0.489406873565
period_SNR  =  22.1934763924
period_log10FAP  =  -14.1698931867
period_uncertainty  =  0.000100855164677
phase_cusum  =  0.277978707913
phase_eta  =  0.424630679986
phi21  =  0.715139075035
phi31  =  2.3024114189
quartile31  =  0.43
r21  =  0.494422945566
r31  =  0.15159412447
shapiro_w  =  0.933781921864
skewness  =  -0.651091874403
slope_per10  =  -0.225627394432
slope_per90  =  0.258799996227
stetson_k  =  0.759421841824
weighted_mean  =  15.3354434689
weighted_std  =  0.307556405327
