-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.30382343239
cusum  =  0.124603246533
eta  =  0.699385815161
hl_amp_ratio  =  0.460592149526
kurtosis  =  -0.447565010154
n_points  =  383
period  =  0.529967415067
period_SNR  =  41.4055129323
period_log10FAP  =  -39.6780429608
period_uncertainty  =  0.000125265601329
phase_cusum  =  0.220131958401
phase_eta  =  0.745229171216
phi21  =  -2.34884222457
phi31  =  -1.2105354255
quartile31  =  0.45
r21  =  0.343643344788
r31  =  0.218600100586
shapiro_w  =  0.934149563313
skewness  =  -0.349176431852
slope_per10  =  -0.0480199628685
slope_per90  =  0.102652198791
stetson_k  =  0.81381685874
weighted_mean  =  14.7387737224
weighted_std  =  0.280849802424
