-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.281444915775
cusum  =  0.126086822127
eta  =  0.502967118493
hl_amp_ratio  =  0.596000230153
kurtosis  =  -0.776773629622
n_points  =  352
period  =  0.662663256173
period_SNR  =  42.667035636
period_log10FAP  =  -45.4717084385
period_uncertainty  =  0.000121750436842
phase_cusum  =  0.223431750121
phase_eta  =  0.295506085728
phi21  =  1.29555547249
phi31  =  -0.560215906125
quartile31  =  0.3625
r21  =  0.46205165643
r31  =  0.203493335167
shapiro_w  =  0.947163283825
skewness  =  -0.484158924066
slope_per10  =  -0.114837098185
slope_per90  =  0.283943524421
stetson_k  =  0.809381985792
weighted_mean  =  13.7189443496
weighted_std  =  0.242457470711
