-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.304148686968
cusum  =  0.185932274598
eta  =  0.600731356483
hl_amp_ratio  =  0.44880214667
kurtosis  =  -0.333376763462
n_points  =  322
period  =  0.600589933735
period_SNR  =  39.8622111953
period_log10FAP  =  -39.0798047183
period_uncertainty  =  0.000100507053665
phase_cusum  =  0.258582822904
phase_eta  =  0.254594086442
phi21  =  0.778479568806
phi31  =  -1.1730585529
quartile31  =  0.36
r21  =  0.461686253114
r31  =  0.31964802226
shapiro_w  =  0.92505979538
skewness  =  -0.689858239714
slope_per10  =  -0.0976827569113
slope_per90  =  0.129147949364
stetson_k  =  0.725841085933
weighted_mean  =  17.0061887955
weighted_std  =  0.270302772386
