-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.77


######### Lightcurve features #########

amplitude  =  0.255310253034
cusum  =  0.126398942437
eta  =  1.21282185872
hl_amp_ratio  =  0.296351889811
kurtosis  =  -0.724267955538
n_points  =  329
period  =  0.0517918663126
period_SNR  =  64.1714748925
period_log10FAP  =  -48.7776223252
period_uncertainty  =  7.4740483267e-07
phase_cusum  =  0.232846343745
phase_eta  =  0.283944023405
phi21  =  0.294676107258
phi31  =  -1.83681775471
quartile31  =  0.32
r21  =  0.353371986667
r31  =  0.122277077231
shapiro_w  =  0.876422464848
skewness  =  -0.778488332906
slope_per10  =  -0.00949805207873
slope_per90  =  0.0141089105855
stetson_k  =  0.730691623887
weighted_mean  =  16.3775483978
weighted_std  =  0.206766882497
