-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.265176738995
cusum  =  0.168735155975
eta  =  0.720914952167
hl_amp_ratio  =  0.575841102235
kurtosis  =  -0.594935150905
n_points  =  174
period  =  0.552052786627
period_SNR  =  24.662954959
period_log10FAP  =  -16.0817212828
period_uncertainty  =  0.000126667421846
phase_cusum  =  0.259952536317
phase_eta  =  0.500029110251
phi21  =  0.824754142649
phi31  =  1.67845961259
quartile31  =  0.3375
r21  =  0.468190384287
r31  =  0.202743288214
shapiro_w  =  0.955507993698
skewness  =  -0.541429411703
slope_per10  =  -0.146833965544
slope_per90  =  0.153874226172
stetson_k  =  0.769113432068
weighted_mean  =  15.1674456958
weighted_std  =  0.228820456593
