-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.39


######### Lightcurve features #########

amplitude  =  0.352319161465
cusum  =  0.348363906075
eta  =  0.244658872253
hl_amp_ratio  =  0.137510871123
kurtosis  =  -0.668353839797
n_points  =  97
period  =  0.864974271903
period_SNR  =  12.7777345427
period_log10FAP  =  -9.52408425071
period_uncertainty  =  0.000261268931353
phase_cusum  =  0.351966475264
phase_eta  =  0.161713708966
phi21  =  0.706577623845
phi31  =  1.78169428107
quartile31  =  0.53
r21  =  0.349741349536
r31  =  0.266760104499
shapiro_w  =  0.78787946701
skewness  =  -0.95078911949
slope_per10  =  -0.34442797871
slope_per90  =  0.605472554738
stetson_k  =  0.645089501474
weighted_mean  =  14.3256621881
weighted_std  =  0.331643370841
