-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.340261916116
cusum  =  0.140384070081
eta  =  0.591193969738
hl_amp_ratio  =  0.559014779849
kurtosis  =  -0.476369154346
n_points  =  248
period  =  0.567046462185
period_SNR  =  36.8707171044
period_log10FAP  =  -30.465619277
period_uncertainty  =  0.000109963765386
phase_cusum  =  0.229429721811
phase_eta  =  0.159760209474
phi21  =  0.727430374409
phi31  =  1.91276063368
quartile31  =  0.4
r21  =  0.474447479433
r31  =  0.304456706352
shapiro_w  =  0.923731923103
skewness  =  -0.679345636981
slope_per10  =  -0.147798739058
slope_per90  =  0.395320679361
stetson_k  =  0.79041571608
weighted_mean  =  13.9618323489
weighted_std  =  0.289429212292
