-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.395525578152
cusum  =  0.128054778052
eta  =  0.525297158277
hl_amp_ratio  =  0.403691760118
kurtosis  =  -0.29554072386
n_points  =  365
period  =  0.607349943929
period_SNR  =  37.5144224937
period_log10FAP  =  -38.5623321704
period_uncertainty  =  0.000101360140215
phase_cusum  =  0.27767761105
phase_eta  =  0.263578505437
phi21  =  -2.40314156471
phi31  =  -4.49617622313
quartile31  =  0.48
r21  =  0.528543013052
r31  =  0.29715633353
shapiro_w  =  0.923972606659
skewness  =  -0.774163494325
slope_per10  =  -0.0583206850978
slope_per90  =  0.0874734467443
stetson_k  =  0.736851929369
weighted_mean  =  11.9665920512
weighted_std  =  0.335275928516
