-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.306868546071
cusum  =  0.136567473943
eta  =  0.577246049624
hl_amp_ratio  =  0.395776401851
kurtosis  =  -0.873542329492
n_points  =  231
period  =  0.477477444481
period_SNR  =  35.1380641766
period_log10FAP  =  -29.466946872
period_uncertainty  =  0.00011695871904
phase_cusum  =  0.233425355586
phase_eta  =  0.279854408662
phi21  =  0.623800394096
phi31  =  -1.47192654356
quartile31  =  0.465
r21  =  0.475497461803
r31  =  0.19169003103
shapiro_w  =  0.909265637398
skewness  =  -0.600301155539
slope_per10  =  -0.120620608324
slope_per90  =  0.11994708711
stetson_k  =  0.78086366219
weighted_mean  =  13.6531597474
weighted_std  =  0.286550201833
