-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.44


######### Lightcurve features #########

amplitude  =  0.162110951425
cusum  =  0.248197857667
eta  =  0.600373502416
hl_amp_ratio  =  0.975197023319
kurtosis  =  -1.23030701566
n_points  =  49
period  =  0.800256092386
period_SNR  =  7.90888412255
period_log10FAP  =  -2.90308651881
period_uncertainty  =  0.000187818281709
phase_cusum  =  0.393651043669
phase_eta  =  0.575908511143
phi21  =  2.98610977847
phi31  =  3.66469531185
quartile31  =  0.24
r21  =  0.163599320629
r31  =  0.139755064888
shapiro_w  =  0.94630920887
skewness  =  -0.116608883734
slope_per10  =  -0.688199996948
slope_per90  =  0.576799977571
stetson_k  =  0.87815461112
weighted_mean  =  12.3393877551
weighted_std  =  0.126190787905
