-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.173529781338
cusum  =  0.1595521063
eta  =  0.574312565214
hl_amp_ratio  =  0.317099717637
kurtosis  =  -1.19471818738
n_points  =  289
period  =  0.63064794822
period_SNR  =  48.8871414478
period_log10FAP  =  -43.7108097072
period_uncertainty  =  0.000158727740238
phase_cusum  =  0.246091212077
phase_eta  =  0.13134274081
phi21  =  0.892927269425
phi31  =  -0.443904361254
quartile31  =  0.25
r21  =  0.356397909591
r31  =  0.16152370628
shapiro_w  =  0.88809132576
skewness  =  -0.523144316788
slope_per10  =  -0.237161309791
slope_per90  =  0.180630858272
stetson_k  =  0.764236227706
weighted_mean  =  14.0759846829
weighted_std  =  0.140565022195
