<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.287182553331
cusum  =  0.122975402767
eta  =  0.824170380657
hl_amp_ratio  =  0.599648027678
kurtosis  =  -0.579661949815
n_points  =  332
period  =  0.674567521879
period_SNR  =  49.5801102842
period_log10FAP  =  -39.0595383043
period_uncertainty  =  0.00012945565858
phase_cusum  =  0.235896766531
phase_eta  =  0.229934117827
phi21  =  -1.89749817793
phi31  =  -0.70809286521
quartile31  =  0.45
r21  =  0.506129478514
r31  =  0.335282523501
shapiro_w  =  0.956168949604
skewness  =  -0.389200334015
slope_per10  =  -0.182990033422
slope_per90  =  0.197691011333
stetson_k  =  0.80035289967
weighted_mean  =  15.1159690769
weighted_std  =  0.273796154094
</pre></body></html>