-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.447271287239
cusum  =  0.163134158402
eta  =  0.503276976929
hl_amp_ratio  =  0.2698487732
kurtosis  =  -0.823760186376
n_points  =  268
period  =  0.615422288582
period_SNR  =  42.0154891873
period_log10FAP  =  -38.3208677429
period_uncertainty  =  0.000151177578422
phase_cusum  =  0.246678123659
phase_eta  =  0.0828782653814
phi21  =  -2.22649702792
phi31  =  -4.22329094678
quartile31  =  0.595
r21  =  0.476944086483
r31  =  0.314226449508
shapiro_w  =  0.871800661087
skewness  =  -0.716645351941
slope_per10  =  -0.186229337724
slope_per90  =  0.297968961067
stetson_k  =  0.744835974374
weighted_mean  =  12.7911794362
weighted_std  =  0.373368391675
