-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.189519589298
cusum  =  0.103715518587
eta  =  0.573543102423
hl_amp_ratio  =  0.783021140416
kurtosis  =  -0.969421451676
n_points  =  359
period  =  0.624331394622
period_SNR  =  44.4486639376
period_log10FAP  =  -46.7708396071
period_uncertainty  =  0.000108466194008
phase_cusum  =  0.277040761982
phase_eta  =  0.330005256535
phi21  =  -1.96367053614
phi31  =  -3.66918146001
quartile31  =  0.26
r21  =  0.396615943556
r31  =  0.162656906115
shapiro_w  =  0.948825120926
skewness  =  -0.369042199967
slope_per10  =  -0.150311550043
slope_per90  =  0.172366407055
stetson_k  =  0.844935626722
weighted_mean  =  15.2287284673
weighted_std  =  0.153660145727
