-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.77


######### Lightcurve features #########

amplitude  =  0.27653400267
cusum  =  0.154273823404
eta  =  0.841235632033
hl_amp_ratio  =  0.472289766259
kurtosis  =  -0.847060607262
n_points  =  120
period  =  0.595239143324
period_SNR  =  21.0492242019
period_log10FAP  =  -14.0214420871
period_uncertainty  =  0.000115796273626
phase_cusum  =  0.276289666191
phase_eta  =  0.258648183694
phi21  =  1.04735084976
phi31  =  -0.686015684902
quartile31  =  0.345
r21  =  0.361548957119
r31  =  0.0963971673836
shapiro_w  =  0.914752423763
skewness  =  -0.605608347816
slope_per10  =  -0.307366658623
slope_per90  =  0.645411107172
stetson_k  =  0.771871965931
weighted_mean  =  14.2975339587
weighted_std  =  0.213904239616
