-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.285192435343
cusum  =  0.160146244645
eta  =  0.735898658222
hl_amp_ratio  =  0.494374407152
kurtosis  =  -0.505259533941
n_points  =  160
period  =  0.517598680539
period_SNR  =  26.5390671182
period_log10FAP  =  -16.6666809842
period_uncertainty  =  0.000126691643523
phase_cusum  =  0.305399235227
phase_eta  =  0.494609718932
phi21  =  -2.15763172045
phi31  =  -0.494974638322
quartile31  =  0.3025
r21  =  0.338681079145
r31  =  0.188170785242
shapiro_w  =  0.941818594933
skewness  =  -0.647230863137
slope_per10  =  -0.16634902533
slope_per90  =  0.258547176841
stetson_k  =  0.761497627052
weighted_mean  =  14.8430858545
weighted_std  =  0.196409996728
