-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.220047896148
cusum  =  0.107539488341
eta  =  0.656783020952
hl_amp_ratio  =  0.487185489498
kurtosis  =  -0.966902232639
n_points  =  312
period  =  0.603782640468
period_SNR  =  40.6603610858
period_log10FAP  =  -41.4090153792
period_uncertainty  =  0.000101578508895
phase_cusum  =  0.283359562076
phase_eta  =  0.102554655722
phi21  =  -1.96705057651
phi31  =  -3.74772102738
quartile31  =  0.28
r21  =  0.461029333833
r31  =  0.297749926772
shapiro_w  =  0.950154423714
skewness  =  -0.38440725286
slope_per10  =  -0.225070306431
slope_per90  =  0.176876449737
stetson_k  =  0.807691740231
weighted_mean  =  16.3981601869
weighted_std  =  0.173590679678
