-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.162916809413
cusum  =  0.135609756752
eta  =  0.817492574468
hl_amp_ratio  =  1.38487553726
kurtosis  =  -0.838339362826
n_points  =  192
period  =  0.813461810138
period_SNR  =  24.4891145608
period_log10FAP  =  -18.5537371906
period_uncertainty  =  0.000313020461006
phase_cusum  =  0.246665955801
phase_eta  =  0.364386517546
phi21  =  1.20427300949
phi31  =  0.237541024742
quartile31  =  0.22
r21  =  0.474042718083
r31  =  0.353824382308
shapiro_w  =  0.97142881155
skewness  =  0.266093924501
slope_per10  =  -0.353346818154
slope_per90  =  0.367650347035
stetson_k  =  0.847070590802
weighted_mean  =  15.3014002273
weighted_std  =  0.144270124657
