-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.24


######### Lightcurve features #########

amplitude  =  0.0233300908631
cusum  =  0.183523434815
eta  =  1.50516096543
hl_amp_ratio  =  1.30366913088
kurtosis  =  1.54775103701
n_points  =  101
period  =  0.229969295217
period_SNR  =  9.92180591581
period_log10FAP  =  -1.37371150442
period_uncertainty  =  1.69959866691e-05
phase_cusum  =  0.209255200872
phase_eta  =  1.32075382729
phi21  =  -0.415057337043
phi31  =  1.71340328879
quartile31  =  0.03
r21  =  0.120746994602
r31  =  0.158788057438
shapiro_w  =  0.959774434566
skewness  =  -0.060683590414
slope_per10  =  -0.33198761524
slope_per90  =  0.470727352925
stetson_k  =  0.738132227502
weighted_mean  =  14.0241813149
weighted_std  =  0.0283297011845
